& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Tikolo in thick of things

MSC hooligans taints a thrilling contest

SPORTS REPORTER
Mohammedan Sporting Club grabbed a lifeline after upsetting Victoria Sporting Club's applecart with an exciting two-wicket win in a
GrameenPhone Premier Super Six match at the Bangabandhu National Stadium yesterday.
Victoria went into their penultimate League match for a win to celebrate their first major domestic title after a long time. But the 'centenary team' of the once reputed outfit could only garner 179 on the board before being all out in 49.4 overs.
They however fought gallantly in defense of their unimpressive total to make the affair a high-voltage drama, where fortune fluctuated from one end to another. Mohammedan could overhaul the target after losing eight wickets and in 49.2 overs.
Mohammedan are now trailing Victoria by two points, and if they can in their final match against Kalabagan they have a realistic chance to go level with Victoria.
Victoria on the other hand will now have to win against Bangladesh Biman in their last match on Friday to clinch the title.
The contest of the two title contenders also had its share of controversy and drama both on and off the field. The match was stopped for about fifteen minutes after angry Mohammedan supporters pelted stones on the field during the second innings.
The trouble started when Mohammedan left-hand batsman Mohammad Rafique was adjudged leg-before while playing and missing a full length delivery from Victoria off-spinner Masudur Rahman Mukul in the 42nd over.
But the worst was to follow when some Mohammedan fans attacked the dejected Victoria team on their way back to the dressing room after the match. Some of them showed the audacity to push and shove national and Victoria captain Khaled Masood in front of police.
The situation took an ugly turn when Mohammedan officials
launched a post-match verbal abuse against what they termed 'biased' umpiring. But a confrontation could be avoided as the rest took the bullies of 'big brothers' in the sports arena casually.
"This is a dreadful incident. We can live with the unruly fans verbally abusing us while we are on the field. But in no circumstance team hoodlums would be allowed to enter the ground and assault cricketers," said
Victoria captain Masood after the match. "I'm really scared about our next match against Biman at Fatullah where the security is not that tight."
While Masood vented his anger about the happenings at the Bangabandhu national Stadium, his counterpart Minhazul Abedin appeared to have engaged in a propaganda blitz regarding the
Biman-Victoria match.
"We want to beat Kalabagan to complete hundred per cent success in the Super Six matches. But I'm in doubt about the fairness of the Victoria-Biman match. Biman might intentionally lose the match against Victoria," said Minhaz, alleging that Victoria had earlier played two arranged affairs against Abahani and Kalabagan.
But apart from the sad episode it was a cracker of a match where Steve Tikolo returned to his brilliant self to guide Mohammedan to victory.
The Kenyan star batsman captured three wickets with his off-spin, took two brilliant catches and scored a fluent 58 to give Mohammedan their 12th win from 15 games.
Tikolo sparked a middle-order collapse by dismissing top-scorer Al-Shahriar for 51. He also had Victoria captain Masood for 10 and captured the wicket of Sajjad Ahmed to finish with three for 22 runs in his ten overs.
The macular right-hander then scored a vital half-century after Mohammedan were reduced to two for 23. Tikolo struck five boundaries in his 77-ball knock.
But despite the brilliant show of Tikolo Mohammedan needed yet another outstanding knock from their injured opener Ehsanul Huq after skipper Minhazul Abedin and Sanwar Hossain departed cheaply.
Ehsanul, who twisted his right leg while fielding, returned straight from the treatment table to score an invaluable 35.
Batting at number seven with a runner, the in-form right-hander braved adversity after Victoria exposed the fragile Mohammedan tail. He struck four eye-pleasing boundaries in his 41-ball knock before being run out in a bizarre fashion with Mohammedan needing another four runs for victory.
Ehsan played and missed a delivery from Mukul, which was gathered by wicketkeeper Masood, who promptly took the bails off with Ehsan's runner Habibul Bashar short of the crease.
Bashar had a disappointing day
on the field. He made only five. The sad departure of Ehsan gave Victoria a hope for a turnaround. But Mohammedan wicketkeeper Anwar and Taposh grabbed those priceless four runs.
SCOREBOARD
Scoreboard of the GrameenPhone Premier Super Six match between Mohammedan Sporting Club and Victoria Sporting Club played at the Bangabandhu National Stadium yesterday.
VICTORIA
Parvez c Bashar b Safiuddin 3
Al-Shahriar c Minhazul b Tikolo 51
Jahangir c sub b Safiuddin 16
Rashed run out 8
K Masood c Rafique b Tikolo 10 Sajjad c Sabbir b Tikolo 2
Kapali c Bashar b Rafique 26
Enamul c sub b Sabbir 8
Mukul c sub b Taposh 10
Saiful c Tikolo b Taposh 10
Extras: (b-1, lb-6, w-10) 17
Total: (All out in 49.4 overs) 179 Fall of wickets: 1-18, 2-72, 3-85, 494, 5-101, 6-102, 7-119, 8-160, 9174
Bowler O M R W
Taposh 9.4 1 39 2
Safiuddin 10 1 28 2
Rafique 10 0 39 1
Sabbir 10 0 44 1
Tikolo 10 0 22 3
MOHAMMEDAN
Rashedul b Saiful 10
Sabbir c & b Mukul 21
Bashar lbw b Monjurul 5
Tikolo lbw b Rashed 58
Sanwar c Enamul b Monjurul 20
Minhazul c Masood b Saiful 4
Ehsanul run out 35
Rafique lbw b Mukul 2
Anwar not out 9
Taposh not out 2
Extras: (b-1, lb-5, w-8) 14
Total: (For 8 wkts in 49.2 overs) 180 Fall of wickets: 1-12, 2-23, 3-78, 4113, 5-122, 6-137, 7-146, 8-176
Bowler O M R W
Monjurul 10 1 39 2
Saiful 10 1 24 2
Enamul 10 1 46 0
Mukul 10 2 22 2
Rashed 8.2 0 36 1
Sajjad 1 0 7 0
Result: Mohammedan SC won by 2 wickets.