& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Abahani out of title race

SPORTS REPORTER
Abahani's bid to regain the Premier Division Cricket League title was over on the May Day when holders Mohammedan
Sporting Club thrashed them by eight wickets in their Super Six opener at the Bangabandhu National Stadium.
With four matches in hand, Abahani are behind leaders Victoria by 10 points.
In-form opener Ehsanul Haque hammered an unbeaten 65 as Mohammedan, chasing a moderate 184, cruised home in 41 overs losing only two wickets.
He laced his 109-ball knock with half a dozen boundaries. The lead-ing run-scorer in the league totaled 654 runs so far from 12 innings at an average of 72.66.
Earlier, put in to bat, Abahani total revolved round a fine 65 from former national skipper Naimur Rahmn. Akram Khan (30) and Moniruzzaman(24) were the other notable run-getters for the skyblues.
Right arm seamer Taposh Baishya and off-spinner Sabbir Khan took three wickets each for Mohammedan.
With this win, Mohammedan joined Biman in the second position of the six-team championship race. Both have collected eighteen points from 12 matches.
SCOREBOARD Scoreboard of the GrameenPhone Premier Division Cricket League match between Abahani KC and Mohammedan SC at the Bangabandhu National Stadiumon on Wednesday:
ABAHANI KC
Nafees lbw b Taposh 0
Mehrab c Shafayet b Taposh 1
Moniruzzaman c Ehsanul b Sabbir 24 Naimur c Bashar b Sabbir 64
Alram c Rafique b Tikolo 30
H Streak b Sabbir 13
Neeyamur c & b Rafique 12
Arman b Rafique 14
Alamgir c & b Taposh 0
Ahsanullah run out 2
Mukhter not out 1
Extras: (b-8, lb-4, nb-2, w-8) 22
Total: (All out in 43.4 overs) 184 Fall of wickets: 1-1, 2-5, 3-95, 4-110, 5-152, 6-152, 7-175, 8-176, 9-178.
Bowler O M R W
Taposh 8 0 33 3
Shafiuddin 6 0 43 0
Ehsanul 2 0 19 0
Rafique 7.5 2 20 2
Sabbir 10 1 29 3
Tikolo 9 1 18 1
Sanwar 1 0 10 0
MOHAMMEDAN SC
Rashedul c Ahsanullah b Alamgir 35
Ehsanul not out 65
Bashar c & b Alamgir 30
Tikolo not out 36
Extras: (b-4, lb-4, nb-5, w-6) 19
Total: (For 2 wickets in 41 overs ) 185
Fall of wickets: 1-57, 2-129.
Bowler O M R W
H Streak 8 1 17 0
Alamgir 8 1 39 2
Neeyamur 2 0 17 0
Arman 9 0 41 0
Ahsanullah 9 0 41 0
Naimur 5 0 22 0
Result: Mohammedan SC won by