& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Enrique light for Barca

Champs league

AFP, Madrid
Barcelona's Spanish international midfielder Luis Enrique is expected to be ready to play against his old club Real Madrid in their European Champions League semi-final second leg on Wednesday.
Luis Enrique, who celebrates his 32nd birthday next week, is a vital component of Barca's bid to overturn a 2-0 first leg deficit but suffered a slight right hamstring strain in Barcelona's 4-1 win over Villarreal on Saturday, a game in which he also scored.
"After Saturday's game I was pessimistic about the prospects of playing, but things have gone better than I expected," he said.
"I'll decide finally tomorrow (Wednesday) but at the moment I think I'll be able to play," he added.
Playing in the match has added significance for Luis Enrique because it will be his 500th first class club match.
"Against Real Madrid there is no problem with motivation but, I have to admit, occasionally you have to look inside yourself for reasons to be ready to play at your best," added Luis Enrique, who is expected to be
going to his third World Cup when the squad is named on May 13.
Luis Enrique scored at both USA 94 - where he also had his nose broken by Italian defender Mauro Tassotti in an off the ball incident in their quarter-finals clash - and France 98 as well as picking up a 1992 Olympic gold medal.
The tally of club matches includes 213 in the famous all-white strip of Real Madrid during a five season stint in the Spanish capital between 1991 and
His move to Barca in the summer of 1996 turned him into a hate figure for many of Madrid fans but Luis Enrique is an expert at turning the odium to his advantage.
"I prefer it if they hate me in the Bernabeu, and they are whistling me, because that's when I know things are going well," he joked.
Luis Enrique still believes Barcelona can progress to the Champions League final in Glasgow on May 15, despite the odds being against them.
"Deportivo beat Madrid 2-1 in the Spanish Cup final, which was held in the Bernabeu.
"Why can't we win 3-1? We are going to fight until the referee blows the final whistle. And if we are going to lose, then we are going to do it with our head held high," he commented.