& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Marseille jolt Chelsea
MARSEILLE.
France. Mar 1: Olympique Marseille shocked Chelsea 1-0 with a sensa-tio-nal goal from Robert Pircs lo u'viw i heir hopes of qualifying I'm the Champions League quarter-finals on Tuesday, reports Reuters.
Pircs scored alter 16 minutes of the Group D clash al the Stade Velodrome as Marseille, who are struggling on the domestic front. claimed a second English scalp after beating Eu ropean champions Manchester United by the same score In October.
Midfielder Jerome Leroy fed Pires on the right and’ the France international broke pasl Marcel Desailly to hit his shot from an almost impossible angle past goalkeeper Ed de Goey.
The ball clipped the near post and then hit the far post belore going In.
Marseille are still bottom of Group D after losing their two previous matches but are only three points behind new leaders Feyenoord, shock 2-1 winners al l^azio.
Chelsea, who played well below their best, and Lazio have identical records with lour points each’and a 3-2 goal dif fere nee.
Defender Desailly said: "We didn't manage to play with our usual rhythm and that helped Marseille gain in confidence. They scored a lovely goal even if II was a bit lucky."
Marseille goalkeeper Stephane Trevisan. standing in for injured first choice Stephane Porato. made a string of fine saves, two at point blank range.
in the final minutes as Chelsea threw everything they had at i he 1993 European champions.
Trevisan went down well to a low shot Into the far corner from Gianfranco Zola in the 84th minute.
He blocked substitute striker Chris Sutton's shot minutes later and dived to turn awav Gustavo Poyet's injury time header from a corner with a brilliant save.
Chelsea were probably surprised by our commitment and our game given our 13th position in the French championship. Marseille’s coach Bernard Casoni said.
"That Feyenoord won at Lazio doesn't mean anything to us riglit now, we had to win here tonight and we have to do the same thing again at Chelsea." he said.
We had a great Trevisan and defenders who gave their all."
Chelsea manager Gianluca Vialli, who was banished to the stands for this match for his behaviour at Lazio, said: The situation has got more complicated with Fevenoord's victory in Rome.
AVe must now nol blow our chances and this means beating a Marseille team that posed us lots of problems. ' he said.
Tm not altogether disappointed despite losing three points. We were not able to convert our many chances."
Marseille had given Chelsea a hint of what might come from the right after only two minutes.
Former Everton striker Ibrahima Bakayoko crossed low and Pouget mishit the ball with only goalkeeper Ed de Goey to beat.
Zola was wide six minutes later with a spectacular scissors kick after striker Tore Andre Flo headed down.
In the 19th minute Pires lost the ball in midfield and it ran to Flo who broke through the middle only to see his low shot turned Just wide of the post by the diring Trevisan.
Three minutes later. Pires could have put Marseille two up but his shot from a cross from the left by Stephane Dalmat was blocked by John Harley near the penalty spot.