& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Windies-England scoreboard
Scoreboard in the Champions’ Trophy match between England and West Indies at the Shajah Cricket Stadium on Saturday:
WEST INDIES: 197 for seven (Hooper 100 n.o.. Simmons 29: Brown 2/28)
ENGLAND
A brown c Lewis b Watah 10
Stewart e Walsh b Rose 23
Knight c D Williams b Mion 10
Hick run out (Ctianderpaull 28 .
Thorpe c D Williams b Hooper 57 A Hollioake c Chanderpaul b DIUon 9
Ealham not out 28
D Brown not out 16
Extras: Ob-7, w-4. nb-S) 1 7
Total: (for six wku in 45 5 overs) 198
Fallofwkts: 1-21; 2-45; 3-53;
4-100; 5-125; 6-173
Did not bat: M Fleming. R Croft. D Headly
Bowling: O 14 R W
Walsh 9.5 1 51 1
Rose 10 0 38 1
Dillon 10 0 38 2
Lewis 6 8 34 0
Simmons 2 0 8 0
Hooper 8 1 22 1
Result: England won by four wickets
Man-of-the-match: Carl
Hooper (Windles)
Tons won by West Indies.