& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

World Team Championship

England retain title
KUALA LUMPUR. Nov 15: Defending champions England retained the World Squash •— Championship men's team title after defeating Canada 3-0 Saturday, reports AP.
Simon Parke, after a brilliant performance against newly crowned world champion Rodney Eyles of Australia in the semifinal Friday, continued his winning streak when he upstaged an injured Jonathan Power of Canada 9-1. 9-0, 9-0 in the first match.
"When I woke up this morning, everything was going fust fine, but about 40 minutes before I came to court I got a back spasm and it really interrupted my game." said Power.
Power, the world number
three, collected the first point in the first game but thereafter it was Parke all the way.
"I expected a tough match against Jonathan and I was ready for it. but after seeing him with a physiotherapist in the second game. 1 knew he cannot make it." said Parke, who is ranked number five in the world.
In the second match. Canada's Gary Waite tried to put his team back in contention out found Chris Walker a tough opponent. The Englishman played with a fast and tight shot and did not give Waite much space.
Walker who took the first game 9-1 in 12 minutes, continued with his tight game to claim both the second and third game 9-3. 9-4 respectively.
"I am glad to be the person who gave the winning point, however it was a team effort and everybody has showed a high team spirit," said Walker.
Dell Harris made it 3-0 for England by beating Graham Ryding 9-1. 9-1 in the third match.
England's coach David Pear-
son said that although his team had gone to Canada at the pool stage, they were confident of retaining the title based on their experience in the last World Championship finals.
"It is nice to win again, but we did not expect an easy win over Canada because they have Jonathan Power who had beaten Parke at the pool stage.” said Pearson.
England won the title two years ago in Cairo after beating Pakistan 2-1 in the final.
The coach said England are in a position to retain the title for the third time in two years time.
We have a young team here. Simon, Dell and Chris could \ stay in the team while we have the other junior players who could out in next two years,"' he added.
Meanwhile, Canadian coach Gene Turk promised a better challenge in the next championship.
"Maybe we did not have good luck, especially with the injury of Power, but I believe that we will come again in two years." said Turk.