& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Lyon pull Inter down
LONDON. Oct 24: Frances Olym-pique Lyon handed Inter Milan their first defeat of the season on
Tuesday when they beat them 2-1 at the San Siro in a UEFA Cup second round first leg match, reports Reuter.
The French side took the lead through striker Ludovic Giuly after 22 minutes after dominating the opening exchanges.
Inter equalised through Maurizio Ganz midway though the second half but the French side grabbed a winner from the penalty spot 10 minutes from time after goalkeeper Gianluca Pagliuca had pulled down Giuly.
Alain Caveglia converted the spot kick.
Inter, last year's beaten finalists. had won 10 out of 11 previous matches this season and drawn the other.
Athletic Bilbao and Aston Villa drew 0-0 but the English side will rue their missed chances.
Villa strikers Savo Milosevic and Dwight Yorke missed straightforward chances at the beginning and end of the first half, when the visitors were in the driving seat.
Athletic came out more strongly after the break, but
again it was Villa that had clear chances, with Milosevic and. midfielder Alan Wright both going close with long-range efforts.
The Spanish side's best effort came when Aitor Larrazabal hit the post with a well-struck volley midway through the second half.
Strasbourg, struggling in the French First Division, turned on the class to beat Liverpool 3-
Striker David Zitelli scored twice as Strasbourg emulated Paris Saint Germain's Cup Winner's Cup semifinal victory over the English team last season.
But like PSG, Strasbourg must now survive the Anfield cauldron in the" second leg. The Parisians lost there 2-0 in April but went through 3-2 on aggregate.
Zitelli opened the scoring in the 20th minute when he drove a superb shot into the roof of the net from 25 metres after Nigerian central defender Godwin Okpara headed a corner back towards the edge of the box.
The striker put the French side, first round conquerors of Glasgow Rangers. 2-0 up 17 minutes into the second half. Wearing a bandage around his head after a clash with Liver-
pool defender Neil Ruddock. Zitelli still managed a fine glancing header from a cros by captain Gerald Baticle past goalkeeper David James.
Ten minutes later. Strasbourg were three up as Liverpool relived their April Paris nightmare.
Karlsruhe won the latest round in the long history of Franco-German soccer duels when they triumphed 2-0 at
Sporting Braga of Portugal look to be another team to have booked their ticket to the third round with a 4-0 first leg home victory over Dynamo Tblisi of Georgia.