& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Rain lords over Lord's
LONDON, June 22: Australia’s slim chances of gaining victory against England in the second Test at Lord's were being washed away Sunday as rain continued to delay the start of play on the fourth day, report agencies.
The first day of the much-awaited encounter was abandoned because of rain and only 96 overs were bowled during the rain-affected second and third days.
But Australia made the most of every minute played and a record eight-wicket haul by paceman Glenn McGrath Saturday helped rout England for a paltry first-innings 77.
England's lowest score at Lord's this century was followed by an equally woeful performance in the field as the home side dropped four catches while Australia moved to 131 for two.
When rain again forced a premature finish on Saturday's third day. Australian opener Matthew Elliott was 55 not out and Mark Waugh was 26 not out.
McGrath’s eight for 38 from 20.3 overs included eight maidens and bettered Australian Bob Massie's first innings figures of eight for 53 in the 1972 Lord’s Test.
It also gave Australia hope of equalling the six-match series after it wufftoRi a 'humiliating nine-wlcltef toss inside four days in the overling Test at Edgbaston.
Australia, already with a first-innings lead of 54, would have been looking to build a healthy lead on the fourth day before declaring in the hope of bowling England out a second time on the last day.
SCOREBOARD
Scorecard at stumps on the third day of the second Test between England and Australia at Lord's Saturday:
ENGLAND: First innings 77 all out
(Thorpe 21, Hussain 19; McGrath eight for 38).
AUSTRALIA: First innings
Taylor b Gough 1
Elliott not out 55
Blewett c Hussain b Croft 45
M Waugh not out 26
Extras: (b-1, lb-3) 4
Total: (for two wickets) 131
Fall of wickets: 1-4; 2-73.
To bat: S Waugh, M Bevan. I Healy, S Warne, P Reiffel, M. Kasprowicz. G. McGrath.
Bowling (to date): O M R W
Gough 13 3 45 1
Caddick 13.2 4 41 0
Malcolm 7 1 26 0
Croft 10 515 1