& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Indians level in style
PORT-OF- SPAIN, Trinidad. Apr 28: Indian bowlers routed the West Indies for a record low 121 on their way to a commanding ten-wicket victory in the second Cable and Wireless one-day cricket international here Sunday, reports AP.
New-ball bowlers Abey Ku ruvilla and Venkatesh Prasad combined to reduce the home team to 32 for five after 12 overs. After a partial recovery, the spinners Noel David and Anil Kumble wrapped up the innings by combining for the last five wickets as the West Indies folded for their lowest total against India. The previous low had been 123 in Calcutta in 1993.
Kuruvilla, the 28-year-old Mumbai pacer, took three for 23 off 10 overs to earn the man of the match award. Fellow six-footer Prasad had two for 22 off eight overs. David, playing his first international for India, was impressive in collecting three for 21 off eight overs, while Kumble captured two for 22 off 8.5 overs.
Captain Sachin Tendulkar dominated India's rain-hit reply. scoring an unbeaten 65. India reached their revised target of 113 in 40 overs with 16.5 overs to spare. The four-match series is now level at 1 -1.
Prasad, the 27-year-old from Karnataka, was responsible for the early West Indies peril, with two wickets in two balls in the third over.
First, he trapped Williams leg before for three. Then, he stunned a crowd estimated at 15.000 by dismissing Lara for a rare first ball duck. Lara edged a pearl of a delivery that was angled across the left-hander to the wicketkeeper.
Kuruvilla soon got into the act with the wickets of in-forpi Shivnarine Chanderpaul, Carl
Hooper and Roland Holder for one run in the space of 12 balls.
Chanderpaul was caught low down by the impressive wicketkeeper Saba Karim for 12. In the same over. Hooper spooned a catch to Saurav Ganguly at mid-on after scoring 14.
Karim, the 29-year-old from Bengal, produced a stunning one-nanded effort to account for Holder. Only included because of a thumb injury to regular wicketkeeper Nayan Mon gia, Karim dived full length to his right to come up with the catch centimetres from the ground.
The West Indies slid to 44 for she through bizarre dismissal of wicketkeeper Courtney Browne.
Browne unleashed a full-blooded drive off leg-spinner Anil Kumble, but the ball cannoned off the silly point fielder Rahul Dravid and deflected for a easy caught and bowled opportunity. Dravid left the field with a badly bruised right shoulder.
The reliable Adams and Bishop halted the slide with a steady seventh-wicket partnership of 56 off 130 balls.
Adams, who passed 1,000 one-day international runs when he made six. top-scored with an unbeaten 35 off 84 balls.
Bishop made 31 off 77 balls with one boundary before he fell to a catch in the deep off David, who celebrated his international debut for India with the wickets of Curtly Ambrose and Franklyn Rose.
Karim finished off the innings with a slick leg-side stumping to account for Walsh off Kumble with 13 balls still remaining in the West Indies innings.
India were left to score 122 to win off 46 overs. When rain delayed play for the third time in the day. India s target was reduced to 113 in 40 overs.
Tendulkar and his new opening partner Saurav Ganguly duly completed their mission undefeated.
Tendulkar, who celebrated his 24th birthday on Thursday, faced 70 balls and hit six fours in his 65. The left-handed Ganguly. who batted with a runner toward the end of innings after straining a groin muscle, made 39 off 77 balls with three boundaries.
The thifd match is in Amos Vale. St Vincent on Wednesday.
SCOREBOARD
Scoreboard of the second limited overs international between India and West Indies here on Sunday:
WEST INDIES
Williams lbw Prasad 3
Chanderpaul c Karim b Kuruvilla 12 Lara c Karim b Prasad 0
Hooper c Ganguly b Kuruvilla 14
Adams not out 35
Holder c Karim b Kuruvilla 0
Browne c and b Kumble 8
Bishop c Prasad b David 31
Ambrose c Sidhu b David 4
Rose b David • 5
Walsh st Karim b Kumble 3
Extras: Ob-3, w-4) 7
Total: (all out. 43.5 overs) 121
Fall of wickets: 1-5; 2-5; 3-32; 4-32; 5-32; 6-44; 7-100; 8-107;9-116
Bowling O M R W
Prasad 8 11 22 2
Kuruvilla 10 2 23 3
Kumble 85 3 22 2
JadHa 8 1 26 0
David 8 0 21 3
Tendulkar 10 4 0
INDIA
Tendulkar not out 65
Ganguly not out 39
Extras: (b-4, lb-3, w-4. nb-1) 12
Total: (no wkts. 23.1 overs) 116
Did not bat: N Sidhu, R
Dravid. M Azharuddin. A Jadeja. S Karim. A Kumble. N David, A Kuruvilla, V Prasad
TENDULKAR ... 65. n.o.
Bowling: O M R W
Ambrose 6 1 21 0
Rase 7 1 31 0
Walsh 6 1 17 0
Bishop 4 0 36 0
Hooper 0.1 0 4 0
Result: India won by 10 wkts after target was reduced to 113 off 40 overs
Man-of-the-match: Abey Kuruvilla
First match: West Indies won by eight wickets after being set a revised target of 146 off 33