& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Agassi outsmarts Stich
VIENNA. Oct 24: US Open cbam pion" Andre Agassi repeated his Flushing Meadow triumph on Sunday by beating Michael Stich in four sets in the final of the 410.000 dollars CA mens tennis trophy in Vienna, reports Reuter.
Agassi won a two hour 48 minute contest 7-6. 4-6. 6-2. 6-3 .when his opponent hit a backhand return of serve long, stretching his unbeaten run against the German to \ six matches. ’
The 24-year-old American, who climbs two places in the ATP rankings to eight, outwitted Stich. 26. with sharp service returns stinging passes and cunning lobs over the tall German.
Stich. supported both by, wife Jessica and pet dog Tessa, hit 18 aces and his backhand worked well for much of the match, but he was often caught
out rushing the net by Agassi, whose film star girlfriend Brooke Shields was not in attendance. '
Both players started nervously in what was a prestige rematch.
Each dropping serve once in an 85 minute first set. The sei went to a tiebreak which Agassi took 7-4 on his own serve after Stich double faulted to go 4-5 down.
Michael Stich Is a very tough player indoors and he started off serving so well and I was a little bit lucky to get back into the first set?" Agassi said after the match.
In the second set. Stich. seeded second, fought back from 3-0 behind to square up at 4-4. He then blasted consecutive backhand and forehand long line winners to lead 5-4 and served out the set with his 17th ace.
Clearly annoyed with giving away the second set. third-seeded Agassi picked up a warning at the beginning of
the third set for swearing at eAmerican umpire Steven "Ullrich.
Ullrich also drew the wrath of Stich for failing to call for silence after taunts of "Boris. Boris" a reference to fellow countrymen Boris Becker — from a group of fans in the 8.000 crowd tn the Vienna" Stadthalle.
Agassi regained his composure and broke in the sixth game, of the third and Stich served his fourth double- fault on break point to give away the set 6-2.
In the fourth set Stich failed to convert three break points in the third game, while Agassi set the scene for his win. breaking in the next game when Stich volleyed a gentle return of serve in to the net.
"I played very good, had a lot of energy, but then in the second 1 got a little tired and a •little loss of concentration. But then 1 pulled it back together and I played really well today to win." Agassi said.