& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Border torments Pak bowlers
BRISBANE, Dec 21: Australian, skipper Allan Border struck an unbeaten 71 as Queensland rea-
ched 318 for five wickets on the third day of their match against Pakistan at the Gabba ground tn Brisbane today, reports Reuter.
Border was in good form after Queensland suffered a mfd-innings collapse, with three wickets falling for 17 runs.
Steve Storey (15) was the other not out batsman at the end of the day’s play.
Earlier, Trevor Barsby struck a whirlwind 1 16— including 23 boundaries —while Dirk Wellham was run out late In the day after weighing in with for 49.
Pakistan declared today at 368 for six with Asif Mujtaba cracking 102 not out.
SCOREHOAKI)
Scoreboard after the third day of the cricket match between Pakistan and Queensland qt the Gabba cricket ground in Brisbane to-dny:
QUEENSLAND: 1st Innings
260
PAKISTAN: 1st Innings Aamir Sohail run out < 65 Shahid Saeed lbw b Law 83
Asif Mujtaba not out 102
Inzamamul-Haq c
McDermott b Storey 83
Saeed Anwar c Border
b McDermott 13
Rashid Latif c and
Bowling: O M R W
Wasim Akram 21 7 43 1
Aaqib Javed 12 2 34 0
Navcd Anjum II 0 70 0
Mushtaq Ahmed 23 2 1OO 3
Shahid Saeed 7 0 31 0
Aamir Sohail 2 O 19 0
Asif Mujtaba 5 1 15 0
ALLAin BORDER... /1 n.o
b Kasprowicz 19
Navcd Anjum c Healy
b Kasprowicz. Q
Mushtaq Mined not out 0
Extras: (21b, 1 rib) 3
Total: (for six wickets declared) 368
Fall: 1-116; 2-176; 3-305:
4-325; 5-360; 6-360.
Bowling: O M R W
McDermott 26 4 95 I
Rowel 26 6 68 0
Kasprowicz 24 6 70 2
Storey 21 1 105 1
Law . 8 4 12 1
Border 3 0 16 . 0
QUEENSLAND: 2nd innings
T. Barsby c Sohail b
Mushtaq Ahmed 116
M Hayden c Mujtaba b
Mushtaq Ahmed 34
P Goggin c Mujtaba b
Mushtaq Ahmed 2
S law c Rashid b Akram 15
A Border not out 71
D Welham run out 49
S Storey not out 15
Extras: (2b, 41b, 9nb. Iw) 16
Total: (for five'wickets) 318
Fall: I -101; 2-157; 3-160: 4-174; 5-301.