& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Gazza takes a knock on Lazio debut
ROME. Sept 28: Paul Gascoigne lasted Just 45 minutes of his Italian league debut for Lazio on Sunday, injuring the knee which he smashed 16 months ago reports Reuter
Gascoigne, who made his longawalted comeback on Wednesday In a friendly against his old club Tottenham, was hurt in a tackle by Genoa's Marlo Bortolazzl close to half time. He failed to reappear for the second half.
His advisor Jane Nottage said: 'Paul is OK. He s fine. He has Just taken a slight knock on his knee."
They took him off as a precaution. but he was going to go off at halftime anyway "
The entire Lazio camp and the 70,000 eroded had feared the worst after the England midfielder collapsed holding his right knee, in which he ruptured cruciate ligaments in the 1991 English Cup final.
Lazio coach Dino Zoff was on his feet anxiously watching developments as club doctor Claudio Bartollni dashed out to treat the 9.4 million dollar signing.
Gascoigne rose and stayed on the pitch for the remaining moments of the half In which he had played well. But he suddenly looked tentative and tested his knee, which had undergone two operations, several times.
He took his place on the bench after halftime and when Lazio scored in the 58th minute through Angelo Greguccf, Gascoigne bounced to his feet, applauding wildly.
Lazio conceded a late goal to Genoa's Michele Padovano to finish with a draw for the fourth league game In succes sion.
TORINO PASS UP
Torino threw away a golden chance to go clear at the top when they conceded two late
goals tn the space of lour minutes and drew 2-2 at Pescara
Torino were two up by half time through Vincenzo Scifo and Uruguayan Carlos Aguilera but strikes by Stefano Borgonovo saved the First Division newcomers and left Torino level on points with AC Milan.
Torrential rain turned pitches tn Northern Italy Into swamps and the Sampdorla — AC Milan clash was washed out 30 minutes before the start. A cloudburst not only flooded the pitch but left the changing rooms awash.
Rain seriously reduced visibility at Juventus. But It failed to stop German striker Andreas Moeller putting them ahead of Roma after 16 minutes with a crisp shot from the edge of the area.
Four minutes later Roma were awarded a corner and thetr Brazilian defender Aldalr punched on a mistake by Italian international Gianluca Vtalli to leveL
A massive second half onslaught by Juventus failed to penetrate a packed Roma de-
fence.
Fiorentina's Impressive start to the season continued in Milan where Argentine Gabriel Batistuta twice gave them the lead against struggling Internazionale.
But In another rainswept game, Inter had midfielders Alessandro Bianchi and German Mathias Sammer carried off injured before the interval.
Batistuta opened the scoring six minutes Into the second half and was on target again six minutes from the end after a move begun by Fiorentina's new Danish signing Brian Laudrup.
Inter were saved by equalisers from Russian Igor Shalimov and Sergio Battistini.
Napoli led bottom side Ancona after only five minutes through Uruguayan Daniel Fonsecca.
They dominated play until carelessly conceding a second half goal to Hungarian Lajos Detail.