& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Bubka soars to another record
PARIS. June 14: No one soars higher or breaks more world records than Sergei Bubka.
The Ukrainian pole vaulter set a record for world records Saturday by leaping to his 30th world mark, topping the 29 held by Finnish distance-running great Paavo Nurmi, reports AP.
16 Indoor marks.
The 28-year-old from Donyetsk, Ukraine, has dominated his event for 10 years, similar to Nurmi's’ reign over distance.
Nurmi ruled distance running as no one ever did. He competed In the 1920, 1924 and 1928 Olympics, accumulating nine gold medals, the most in track and field history. with six individual and thru
Hubka flow to an outdoor mark of 6.11 meters (20 feel, 1/2 inch) in the pole vault at an international track meet in Dijon. It was his 14lh world outdoor record; he also holds
team wins.
Nurmi set world records at distances from 2.000 lo 20,000 meters. His record for six miles lasted 18 years, for-10 miles 17 years, and the
mile eight years. In the 1924 Olympics, he set world records for the 1,500 and 5,000 meters in the space of one hour.
Ironically, Bubka snatched the record for holding the most records from Nurmi on the 95th anniversary of the Finn’s birth in Turku. Finland.
Starting Jan 15. 1984, when he broke his first indoor mark at 5.81 meters (19 feet. 3/4 inch). Bubka has broken at least one world record a year.
His best pace came In 1991, when he broke the record four times indoors and four outdoors and became the only vaulter to clear 20 feet (6.10 meters), doing it six times.
Bubka set the old outdoor mark of 6.10 meters (20 feet) last year fn Malmo, Sweden. His best indoors is 6.13 meters (20 feet, 1-1/2 inches) set in Fcbruajy fn Berlin.
The closest anyone has come to him is Russian rival Rodion Gataullin, who reached 6-02 meters (19 feet, 9 inches) three years ago but hasn't equaled it since.
Bubka still thinks the upper limits are higher — a lot higher — than his present mark.
"As the technology of making poles'Improves and as new materials come available, 1 can see vaulters jumping 6.30 to 6.40," Bubka said last year.
That lands between 20 feet, 8 inches, and 21 feet
Bubka was named the Athlete-of-thc-Year for the second time by Track and Field News last year. Since winning the 1983 World Championship as a 19-year-old, Bubka has been named top vaulter seven times. He won the 1988 Olympic gold medal and the 1987 and 1991 world titles.
If the Soviet Union had not boycotted the 1984 Olympics, chances are Bubka would have won. He broke the world record just before and after the Los Angeles Games.
Although plagued by a heel injury, he showed at the Meeting de DiJon that he is still better than anyone. He took three jumps on the first attempts and made all three clearances by good margins.
My foot still hurts, and that
Is why I try to be the most precise and Jump the fewest jumps possible." he said.
At last year's world championships) with his heel hurting, he had to take an all or nothing chance at 5.95 meters (19 feet. 6 1/4 Inches). He made it.
"When the event comes down to every single jump, it is you versus the bar." Bubka told Track and Field News.
"The vault isn't like many professions — there Is nobody else that you can rely on when there is a challenge. You cither make it by your own efforts, or you don’t."
The outdoor meet was his third of the season. Previously, Bubka went 6.00 meters (19 feet, 8-1/4 inches) In St Denis on June 4 and 5.85 meters (19 feet. 2 1/2 inches) Tuesday in Rome.
He says he is scheduled to Jump three more times before the Olympics: Hengelo. Netherlands, on June 28; Lausanne. Switzerland, on July 8; and Stockholm on July 13.