& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Platt goals rescue England
HELSINKI. June 4: David Platt scored twice (o rescue England and lead them to a morale-boosting
2-1 victory over Finland In their last dress rehearsal for the European Championship on Wednesday, reports Reuter.
But England's Joy was clouded as Liverpool's Injury-plagucd winger John Barnes, in only his second International appearance of the season. limped out of the game — and the championship — after Just 10 minutes with a ruptured Achilles tendon.
Finland, who have never beaten England In 55 years, started aggressively and rocked them when took the lead with a penalty through Ari Hjclm in the 27th minute.
England were caught short at the back as the Finns broke, and Trevoer Steven was penalised for catching Jari Litmanen's ankle as he reached for Kimmo Tarkkio's cross.
England stepped up the pace and went close to equalising two minutes before ha 'Mme when Stuart Pearce's si '»t was palmed on to the post
and the rebound hit the underside of the bar.
But before the Finns had finished exhaling a breath of relief, an unmarked Platt picked up a through ball from Steven and beat goalkeeper Olli Huttuncn with a low shot.
Platt, who is expected to leave Bari for top Italian club Juventus next season, grabbed his 10th goal in 29 interna tionals and his third in the last two with a powerful volley from a comer in the 62 nd minute.
Barnes, who was replaced
by Arsenals' Paul Meson in the 16th minute, was not the only England casually.
Defender Gary Stevens was substituted at halftime after suffering a nasty kick on his foot and may also miss the championship. He will have an X-ray on Thursday.
T don't know what will happen with Stevens until we have the medical report," manager Graham Taylor said.
But he said Barnes was definitely ouL
"He will be out of the Euro pcan. Championship, out of football for a period of time." he said.
"Obviously I am very disap pointed. But won't knock us out. When things like this happen so very, very late you Just have to take it on the chin."
England, who start iheir Championship campaign on June 11 against Denmark looked unconvincing against the Finns, and Taylor admit led: Tt was not the greatest of games."
He said, however, he was pleased with Platt's performance and the way Mark Wright filled his unaccustomed sweeper role.