& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Ben takes another beating
SAO PAULO. Mny 18: Ben John son's bid to become a serious In te rnatlonal title contender
again took a further knock on Sunday when he missed the Olympic 100 meters qualifying time at the Sao Paulo athletics Grand Prix, reports Reuter
The Canadian sprinter banned from all competition for two years when he tested positive for a banned anabolic steroid after winning the 1988 Seoul Olympic 100 me ters final, finished fifth 1n 10.44 seconds The qualifying time 1s 10.30
Former world record holder Johnson was clearly nervous at the start and false started
At the second attempt, he got away quickly but fen away in the second half of the race finishing fifth behind Brazilian
Fernand Botassn
The rare was won by world bronze medallist Dennis Mltchecll of the United States In 10.15 seconds. Mitchell was virtually Ignored while Johnson was surrounded by an army of reporters, photographers and cameramen.
Despite hts poor performance Johnson said he was
satisfied with his performance
It was mv best run this year. I will keep trying and there are two months to go.’ he said
Johnson was not selected for the Canadian 100 meters
team (or last year's World Championships and ran In the 4X100 relay team only.
AOUITA WINS 1500
Moroccan Olympic gold medallists Brahim Boutayeb and Said Aoutta both won their
Boutayeb spent most of the 5.000 meters In second place before overtaking Kenyas Jonas Koech with Just under a hip to go to record a comfortable win "I used my head, not my physical strength." he said
Aouita passed Brazlllian Edgar de Oltveira on the final straight of the 1.500 meters.
"It was a difficult race for him and he had to make a big effort," Oltveira said "I expect he thought he would come to Brazil and win easily "
World champion Samuel Matete of Zambia cut It fine tn the 400 metres hurdles, winning by just 0.05 seconds from American McCllonton Neal. Olympic champion Andree Phillips of the US could finish only sixth
Olympic champion Petra Felke-Mpter of Germany won the women s javelin but her best throw of 67 50 metres was way short of her world record of 80 metres.
Brazil’s Jose Luiz Barbosa delighted the home crowd with a thrilling win over Rocky Clark of the United States in the 800 metres
Clark ted off the final curve but Barbosa, urged on 15,000 frenzied fans, forced hts way past and raced on to victory