& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Sabatini stays Roman queen
ROME. May 10: Gabriela Sabatini rallied from a 5-2 first-set deficit, saved three set points and beat
Monica Seles for the second straight year to win the Italian Open. 7-5, 6-4 on Sunday, reports AP.
'I always play well here In Rome, the crowd always helps.' the Argentine said as the 10,000 spectators at the Foro Italico broke into loud cheers after the 110-minute match.
Seles, who like Sabatini had not lost a set all week, raced to within a game of winning the first set. getting inside the baseline to hit sharply angled winners past the second-seeded Argentine.
But Sabatini then changed her tactics, hitting hlg* bouncing groundstrokes that kept Seles well back of the baseline.
Trailing 5-3 Sabatini saved three set points to earn a break, held service and then broke Seles again to take the set in 62 minutes.
The pace slowed In the second set. but Sabatini picked up the pressure by going to net and scoring repeatedly with volleys hit far from Seles' reach.
The victory, worth dlrs 110,000. was Sabatini's fifth in nine tournaments this year.
Seles, who lost 6-3. 6-2 In last year's final, had won five of the six tournaments she entered before Rome.
TH try to do better next year, hopefully 111 have more luck,' Seles told the crowd.
An earlier report by Reuter said: Defending champion Gabriela Sabatini beat American Mary Joe Fernandez 6-2, 6-3 In the second semifinal on Saturday to set up a repeat of last year's final against Monica Seles.
Sabatini, winner here three times in the past four years, delighted her host of young Roman fans with her comfort able win over fourth seed Fernandez.
But the American, who struggled against German Anke Huber on Friday night, was again below her best and the match was a disappointing spectacle.
The Argentine stormed into a 4-0 lead In the first set before Fernandez had properly settled.
Sabatini quickly broke Fernandez tn the second set.
The American missed her last chance to get back Into the match when she had six breakpoints with Sabatini leading 4-2 but faded to convert any of them.
Yugoslav Seles qualified for today's final earlier with a 6-0. 6-4 win over South African outsider Amanda Coetzer.
Sabatini beat Seles 6-3, 6 2 in the final here last year.
'I'm really looking forward to the match tomorrow,' Sabatini said.
'Seles is playing well. Last year I played a very good match against her and I must reproduce that," the Argentine added.
Fernandez said her failure to take the seventh game in the second set. when she squandered the six break points, had decided the match
'I'd have been back into It if I d won that game.' she said.
Fernandez. who beat Sabatini in the semifinals of the Australian Open this year, also felt she should have been more aggressive.