& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Hong Kong beat Thailand
HONG KONG. May 3 : Thailand gained small consolation by winning both the dead' reverse singles in
the Group Two Asia- Oceania zone Davis Cup final against Hong Kong here Sunday, reports AFP.
Woraphon Thongkamchou, coming in for the injured Narathorn Srichaphan. carved out a 6-3. 6-7, 2-7. 8-6 victory over the British territory's number one player Michael Walker.
Then Thankorn Srichaphan took the other reverse singles, reduced to a best of three sets format, beating Colin Great 6-2, 6-4.
Both reverse singles were of academic interest as Hong Kong had already clinched the tie by winning both the opening singles and the doubles.
Hong Kong's victory earned them qualification into the zonal Group One next year.
Thailand were left to ponder what might have been If their number one player.
Narathom. had not succumbed to cramps on the opening day of the tie.
The 19-year-old Narathorn seemed well on course towards victory in the first match against Grant when he pulled a muscle and suffered a bad cramp midway in the game. He finally retired, with the score reading 3-6, 2-6, 6-2. 6-1.
Results :
Opening singles :
Colin Grant (Hong Kong) bt Narathorn Srichaphan (Thailand) 3-6, 2-6, 6-2, 6-1 . retd.
Michael Walker (Hong Kong) bt Thanakorn Srichaphan (Thailand) 6-4, 0-6. 6-4. 6-3.
Doubles :
Michael Walker/Mark Bailey bt Wlttaya SamreJ/Woraphon Thongkamchou (3-6), 4-6. 6-2. 6-3. 6-4
Reverse singles :
Woraphon Thokgkmachou bt Michael Walker 6-3. 6-7(2-7), 8-6
Thanakorn Srichaphan bt Colin Grant 6-2, 6-4.