& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Imran’s men win Wills Trophy as

Aaquib Javed devastates India
SHARJAH Oct 25: auib Javed in a hattrick of wickets in one over on Friday to lead Pakistan to a
crashing 72-run win over India tn the Wills Trophy final here, reports AFP
The 22-year-old Pakistani paceman claimed Ravi Shastri. Mohammed Azharuddin and Sachin Itendnlkar leg before in his third over to. become the sixth bowler lo achieve the leal In one-day internationals.
Javed's fuiy left India devastated at 47 for four and gave the former world champions little room to make a match of it after Pakistan scored the
tournament's highest total of 262 for six.
Javed finished with figures of seven for 37. a recorded in one-day cricket, as India were shot out for a paltry 190 in 46 overs. Javed was the obvious choice for the man of the-match award while Sanjay Manjrekar of India, who scored 272 runs in the five matches, was declared the man-of-the -series.
to 23 for two toy the 210th over.
Faxal. 22. and playing only his sixth one-day international, slammed eight fours and a ata In a su^fore being stretchered off after being ear Her hit on the ankle by a Kapil Dev delivery It was a cruel dental of a maiden century after such an entertaining 120-ball Innings.
Malik made a polished 87 off 96 balls, hitting the be leagured Indian attack for six boundaries and a six
Fazal s unfortunate depar Jure from the crease slowed Pakistan's run-rate, but it was still good enough to put pressure on the famed Indian batting line up.'
When Zahid retired hurt. Pakistan were 194 for 2 in 41 overs and set for a score of around 275 plus.
But the last nine overs produced only 68 runs against steady bowling by Kapil Dev add Prabhakar. India s best bowlers on view today. Kapil ended with three for 36 in 10 overs while Prabhakar had three for 54.
Pakistani manager Intikhab Alam said Fazal had been taken to hospital for precautionary X-rays.
Coming to bowl the 10th over at the score of 32 for no loss. Javed had Navjot Siddhu caught at the wicked with the second delivery. The Indian opener made 21.
Shastri and Sanjay
Manjrekar carried the score to 47 when Javed began his third over, the 14th of the innings.
which was to change the complexion of the match.
With the third delivery.
Javed trapped Shastri leg before for 15 after seeing wicketkeeper Moin Khan miss a sitter off the previous ball.
The next delivery was a fast inswinger which caught Azharuddin on the back pad and Sri Lankan umpired W. A. Wlckramasinghe raised his fin ger despite the Indian captain indicating the ball had touched the bat first.
Tendulkar walked in to a warm applause from the Indian fans, but failed to negotiate a deadly yorker which rapped him hard on to pad*.
Seeing the umpire's finger go up again. Javed Jumped up tn joy as team-mates rushed to congratulate him on the rare feat.
Javed is the third Pakistani after Wasim Akram, who has done it twice. and Mohammad Jalaluddln to join the select band. Kapil Dev and Chetan Sharma of India and Bruce Reid of Australia are the other bowlers to take hat-tricks in one-day matches.
Manjrekar and lefthanded Vinod Kambll added 53 for the fifth wicket to take the score to 100 in the 28th over when Kambll was run out for 30 while going for a cheeky single.
But Javed was not finished Cwlth the day's exploits. He led Kapil Dev for eight in hi* eighth over and then removed Manjrekar In hi* ninth with the aid of a brilliant catch by fellow paceman Waqar Youni*. Manjrekar. who hit twt^ sixes and three fours in his 52 off 69 ball*, cut Javed to third man where Yount* dived in front to pick up a one-handed catch.
There was a wicket for the irrepressible Javed in his tenth and final over as well as Prabhakar (7) hooked a short ball to Aamer Sohail at fine leg.
The only other bowler to claim seven wickets in a one-day international is Winston Davis of the West Indies who did it against Australia in the 1983 World Cup. but at the cost of 51 runs.
Kiran More and Javagal Srinath added 34 for the ninth wicket to delay the inevitable . with Srinath hitting one six in a score of 14.