& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Hamstring Botham's bane
• j BIRMINGHAM.
• England. May 25:
-- England's cricket
all-rounder Ian
i ll ' Botham and spinner Richard Illingworth out of the second one-day international against West Indies, reports Reuter.
Both played prominent roles in England's dramatic one-wlcket win over West Indjes on Friday at Edgbaston but will miss the second international at Old Trafford. Mancester today.
Botham could be out for much longer after pulling a hamstring while batting.
In their place England have recalled veteran off-spinner Eddie Hemmings at the age of 42 and given a first call-up to Warwickshire all-rounder Dermot Reeve.
Botham's triumphant England return after an absence of
almost two years ended in agony as he pulled up limping after running a quick single. He received treatment on the
field but was out to the next ball he faced.
"We don’t know yet the extent of the Injury and I've got
to wait 24 hours to see if It settles down." Botham said.
These sort of Injuries are weird -- sometimes you can recover from them ' quite quickly."
Illingworth, the last man. shared in an unbroken 10th wicket partnership of 23 and hit the winning runs. Only afterwards was It revealed he had a painful wrist injury.
"Richard batted in a lot of discomfort. He could not hold a bat in the nets this morning, not even to face my bowling", said England manager Micky Stewart.
He underwent an X-ray on Thursday after being hit on his left wrist while fielding.
Besides, missing the two remaining one-day fixture. Botham, who took four West Indies wickets on Thursday, could also miss out on his longed-for return on June.