& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Blackmore’s strike puts United in semis
MONTPELLIER, France. Mar 20: A lightning strike by Clayton Black-more caught Mo- ntpelller on the hop and set Manchester United on the road to the semifinals of the European Cup Winners Cup here Tuesday, reports AFP.
The French side never recovered from the shock of the Welsh international's direct hit from a free kick in the dying seconds of the first half. Their heads dropped In the second half and were fortunate to lose by only 2-0.
Montpellier goalkeeper Claude Barrabe only saw Blackmore's shot coming at the last second. He half caught the ball, but It flew out of his hands and on Into the net.
"I couldn't believe it when I saw the ball," said Barrabe "It didn't fully register that the kick had been taken."
Montpellier, who had only been beaten once at home in the previous 18 months, returned for the second half numbed and within two minutes of the restart went further town.
Balckmore was running onto a ball in the Montpellier penalty area when Patrick Colteter came in with a clumsy trip and Austrian referee Hubert Forstlnger had no choice but to point to the
United's penalty specialist Steve Bruck calmly converted, ending the ball to the left of Barrabe. He has not missed a kick for two years.
The 2-0 win gave Manchester a 3-1 aggregate win In the quarter final match
They are the only English Club left In European competition in the first English cam palgn on the continent since the ban Imposed after 1985 Heysel disaster was lifted.
After being held at Old
Trafford, the pressure was more on Manchester to produce goals, but Montpellier had the better early chances before the capacity 23,000 crowd, which included only 1,100 Manchester fans.
Another 1,400 were left tlckctlcss outside forced to watch on televisions installed outside city centre cafes. One 25-year-old Britton was stabbed in a fight with a group of Nynch fans just before the kick off. He was in a stable condition in hospital.
Clement Gracia, who started the season with Third Division Grenoble, thundered the ball past the outstretched hand of Les Sealy in the fourth minute but It also went across the face of the Manchester goal.
Minutes later Montpellier's Polish striker Jack Ziober also had a good chance. But Manchester grew th confi-
dence as the first half progressed though they never had a clear opportunity.
Montpellier's problems started after Paul Ince was left writhing In agony by a Frank Lucchesi tackle that left stud marks from his knee to the top of his thigh.
After a prolonged stoppage, Jean Luc Thetis fouled Mark Hughes almost from the Restart and Blackmore struck with his surprise goal.
Thetis was later sent off for a second bookable offence after a protracted and niggling with Hughes who has not been forgiven by the French for his apparent play acting rote that had Pascale Bails sent off in the first leg.
Bruce's penalty goal forced Montpellier's Polish coach Henryk Kaspcrzack to make changes. Striker Daniel Xuereb came on for defender Regis Brouard and Partice Garande
replaced an injured Ziober.
But it had little effect and united had more clear chances.
Ten minutes into the second half, Mike Phelan head into Barrabe’s arms from close In. Three minutes later Blackmore had a free kick from the left wing parried away by the hardpressed Montpellier keeper.
Hughes also headed inches over and after 31 minutes two shots In 10 seconds thudded' off the Molpcllier post with Barrabe stranded.