Testing facilities
FROM PAGE 1
Dhaka who are long experienced in collecting respiratory samples,” Dr ASM Alamgir, principal scientific officer of IEDCR, told The Daily Star.
He said the samples are then processed through real-time reverse transcription polymerase chain reaction (RT-PCR), a laboratory technique for the in vitro qualitative detection of novel coronavirus -- which is only available at the IEDCR.
“The detection of virus from the specimens is a complex process. As the 2019 novel coronavirus is an RNA virus, we have to extract the RNA [ribonucleic acid] and then convert it to cDNA [complementary DNA] which is further synthesised to detect the virus.
“The process requires strict temperature control and absolutely contamination-free environment otherwise the specimens can show false positive and false negative results,” he added.
Experts say any breach in laboratory safety can release the virus in the atmosphere and lead to an epidemic.
The US Centers for Disease Control and Prevention recommends using BSL 3 (Biosafety level) laboratory while working with live virus.
IEDCR is conducting tests in a BSL 2 laboratory.
According to Dr Alamgir, a BSL 2 laboratory is more than sufficient for pathological investigations, as they work only with dead viruses there.
However, working in a BSL 2 laboratory also requires strict training in maintaining safety, quality control, and hygiene protocol, he added.
“In IEDCR, we have a pool of experienced professionals who have been working in this environment for a long time. This is also a reason why we are not expanding the diagnosis facility to other hospitals,” he said.
Noted physician Dr ABM Abdullah concurs that keeping the diagnostic process centralised for the moment is the right decision.
“In case of a massive outbreak, there is no doubt that IEDCR will have to expand facilities to district-level hospitals. But for now, this is the right decision,” he told The Daily Star.
“Since COVID-19 is a completely new phenomenon, we don’t have the sufficient manpower and technology to detect it,” said Abdullah.
Besides, if a diagnostic centre conducts this test, they might not be able to quarantine the patients and their contacts immediately which IEDCR is doing by coordinating with local hospitals, he added.
Dr Alamgir said the country’s health system is well prepared to tackle an outbreak, with the institute regularly conducting training for district level physicians.
If the disease spreads in the country, it will not be necessary to conduct test for all patients, he said.
“Thanks to our trainings, doctors will be able to detect coronavirus patients by observing symptoms and give symptomatic treatments. So far, this is our plan for a massive outbreak,” he added.
PREPARATION FOR DMCH’S ISOLATION UNIT STILL UNDERWAY
Over a month ago, Dhaka Medical College Hospital (DMCH) opened an isolation unit for coronavirus patients, but it still lacks certain facilities essential for treating patients carrying the virus.
Located on the ground floor of DMCH Building-2, the hospital authorities transformed its acute medicine unit into a 12-bed isolation unit.
A special laboratory, capable of conducting tests like ultrasonography, endoscopy, and X-rays, has been attached to the unit.
However, the unit does not yet have life support and artificial respiration facilities.
“We have sufficient amount of personal protective equipment (PPE) for our staff. We are also in the process of procuring more equipment,” Brig Gen AKM Nasiruddin, director of the hospital, told The Daily Star.
At present, the unit is ready to receive patients, he said, adding that, “We are working to turn this unit into an independent, fully-equipped corona-care unit.”
On January 26, the IEDCR sent a letter to all divisional and district hospitals, asking them to set up such isolation units.
“We are fighting an invisible enemy and we still don’t know much about its nature … we are taking preparations,” added the DMCH director.