#Title
Fire incidents & NUMBER OF Deaths in last 5 years
7 %
39 %
Unidentified
Electric short circuit
21 %
Year
Number of incidents
Others
17,488
16,858
18,105
19,642
24,074
2015
2016
2017
2018
2019
68
52
45
130
184
15 %
18 %
Cigarette butt
Kitchen
stove
Major sources of fire