& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

AUSSIE-ZIM SCORECARD
Scoreboard at stumps on the second day of the first cricket Test between Australia and Zimbabwe at the WACA Ground on Friday:
AUSTRALIA: First innings (overnight 372 for three)
Langer b Ervine 26
Hayden c Carlisle b Gripper 380
Ponting lbw Ervine 37
Martyn c Wishart b Gripper 53
Waugh c and b Ervine 78
Lehmann c and b Ervine 30
Gilchrist not out 113
Extras: (lb-10, w-1, nb-3, b-4) 18
Total: (For six wkts dec
in 146.3 overs ) 735
Fall of wickets: 1-43, 2-102, 3-
199, 4-406, 5-502, 6-735.
Bowler O M R W
Streak 26 6 131 0
Blignaut 28 4 115 0
Ervine 31 4 146 4
Price 36 5 187 0
Gripper 25.3 0 142 2
ZIMBABWE: First innings
Ebrahim b Gillespie 29
Gripper not out 37
Vermeulen not out 9 Extras: (lb-1,w-1, nb-2) 4
A
Fall of wickets: 1-61.
Bowler O M R W
Lee 6 1 21 0
Gillespie 10 4 15 1
Bichel 7 0 25 0
MacGill 7 2 17 0
Lehmann 1 1 0 0
Umpires: Srinivas
Venkataraghavan (India), Peter Willey (England)
Toss: Zimbabwe.