& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Fighting Proteas

BBC Online, Rawalpindi
South Africa levelled the one-day series by beating Pakistan by six wickets at the Pindi cricket stadium here on Friday..
The two sides will go into the final one-day international at the same venue on Sunday.
South Africa's seam attack proved too much for Pakistan as they were bowled out for 157.
Andre Nel (4-39) and Makhaya Ntini (3-25) did most of the damage, while Shaun Pollock returned remarkable figures of 1-9 from his 10 overs.
Pakistan captain Yousuf Youhana made 60 off 75 balls for Pakistan, but six batsmen failed to reach double figures.
In reply, South Africa raced to the total with more than 10 overs to spare.
Jacques Kallis was unbeaten on 58 and Herschelle Gibbs made a useful 41.
Pakistan made three changes to the side beaten in Faisalabad on Tuesday.
Naved Latif, Shabbir Ahmed and
Mohammad Sami were brought in at the expense of Abdul Razzaq, Saqlain Mushtaq and Umar Gul.
They were again led by Youhana in the absence of Inzamamul Haq (hamstring strain) and he chose to bat first after winning the toss.
Nel broke through in the sixth over when he found the edge of Mohammad Hafeez's bat and he was caught behind for a single.
SCOREBOARD
Scoreboard of the fourth one-day international match between Pakistan and South Africa at the Pindi Cricket Stadium on Friday PAKISTAN
Hafeez c Boucher b Nel1 1
Hameed c Boucher b Hall 30
Iqbal c Hall b Nell 0
Youhana c Pollock b Nell 60
Younis Khan c Boucher b Nel1 3
Naved b Pollock 4
Malik b Makhaya Ntini 5
Latif b Kallis 18
Akhtar c Boucher b Ntini 0
Sami not out 16
Shabbir b Ntini 2
Extras: (lb-2, w-6) 8
Total: (All out in 47.4 overs) 157
Fall of wickets: 1-11, 2-16, 3-59, 4-105, 5-114, 6-120, 7-122, 8-122, 9-150
Bowler O M R W
Pollock 10 4 9 1
Nell 10 0 39 4
Ntini 7.4 0 25 3
Hall 8 1 31 1
Peterson 5 0 31 0
Kallis 7 0 20 1
SOUTH AFRICA
Smith b Sami 13
Gibbs b Akhtar 41
Kallis not out 58
Rudolph c Latif b Hafeez 20
Dippenaar c Hafeez b Malik 11
Boucher not out 4
Extras: (lb-6, nb-4, w-1) 11
Total: (For four wkts in
38.5 overs) 158
Fall of wickets: 1-31, 2-73, 3-116,
4-153
Did not bat: S. Pollock, A. Hall, R.
Peterson, M. Ntini, A. Nell
Bowler O M R W
Akhtar 7 2 23 1
Sami 6 0 38 1
Shabbir 6 1 36 0
Malik 10 0 29 1
Hafeez 9.5 1 26 1
Result: South Africa won by six wickets.
Man-of-the-match: Andre Nell.
Toss: Pakistan
Umpires: Darrell Hair (AUS) and
Aleem Dar (PAK)
TV umpire: Asad Rauf (PAK)
Match referee: Clive Lloyd (WIs)