& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Pak go 2-up

AFP, Lahore
Upbeat Pakistan put on another brilliant display to down a rusty South Africa by 42 runs in the second daynight limited overs international at Gaddafi Stadium here on Sunday to open up a 2-0leadin the series.
SCOREBOARD
Scoreboard of the second one-day international match between Pakistan and South Africa at the Gaddafi Stadium on Sunday:
PAKISTAN: 267 for sevenin 50 overs. SOUTH AFRICA
Smith c Younis b Sami 6
Dippenaar b Hafeez 58
Kallislbw b Hafeez 42
McKenzie run out 3
Boucher run out 5
Rudolphlbw b Hafeez 25
Pollock run out 11
Hall b Sami 8
Peterson b Sami 1
Dawson not out 23
Ntini not out 16
Extras: (lb-9, nb-6, w-12) 27
Total: (For nine wktsin 50 overs)225
Fall of wickets: 1-19, 2-108, 3-116, 4121, 5-138, 6-163, 7-168, 8-174, 9-187 Bowler O M R W
Sami 8 1 20 3
Gul 9 0 54 0
Shoaib 8 0 43 0
Razzaq 7 0 27 0
Hafeez 10 0 37 3
Malik 8 0 35 0
Result: Pakistan won by 42 runs. Man-of-the-match: Mohammad Sami. Toss: SouthAfrica
Umpires: Darrell Hair (AUS) and
Nadeem Ghauri (PAK)
TV umpire: Asad Rauf (PAK) Match referee: Clive LIoyd (WIs)