& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

PAK-SA 1ST ODI SCOREBOARD

AFP, Lahore
Final scoreboard of the first daynight one-day international between Pakistan and South Africa which the hosts won by eight wickets at the Gaddafi Stadium here on Friday:
PAKISTAN: 277 for 6 in 50 overs (Malik 82, Youhana 68, Hameed 56, Inzamam 37; Kallis 2-53)
SOUTH AFRICA
Smith c Inzamam b Akhtar 71
Dippenaar not out 110
Kallis b Akhtar 1
McKenzie c Hafeez b Akhtar 62
Boucher b Akhtar 1
Pollock c Inzamam b Sami 0
Rudolph run out 3
Hall not out 0
Extras: (b-3, lb-5, nb-8, w-5) 21
Total: (For 6 wkts in 50 overs) 269
Fall of wickets: 1-138, 2-140, 3241, 4-244, 5-245, 6-268
Did not bat: Dawson, Peterson, Ntini
Bowler O M R W
Shoaib 10 0 49 4
Sami 10 0 44 1
Mushtaq 10 0 65 0
Razzaq 5 0 30 0
Hafeez 5 1 26 0
Malik 10 0 47 0
Result: Pakistan won by 8 runs. Man-of-the-match: Shoaib Malik Toss: Pakistan
Umpires: Darrell Hair (Australia) and Aleem Dar (Pakistan)