& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

The Real class

AFP, Oporto
Real Madrid came from behind to cruise past FC Porto with a 3-1 victory in the Champions League group stage tie here on Wednesday.
With Raul only making a late appearance as a substitute and David Beckham absent with an injury, Real drew on their awesomely deep squad to dominate the UEFA Cup holders after trailing to a seventh minute goal from Costinha.
Ivan Helguera brought Real level and Santiago Solari gave Real a halftime lead before Zinedine Zidane, playing with a bandaged head wound, scored Real's third with an exquisite half volley.
Porto dominated the first 20 minutes and got an early reward when Real goalkeeper Iker Casillas could only palm away a free kick from
Deco and Costinha was well-placed to headit in.
Casillas prevented Porto going two goals ahead when he was at full stretch to save Derlei's close-range shot.
But soon Real hit their stride and Helguera started and finished the move that produced Real's equaliser, moving the ball out to Zidane who found Solari. The Argentinian's cross was perfect for Helguera to nod the ball home, leaving goalkeeper Vitor Baia rooted to the spot.
Real missed a golden opportunity to take the lead ten minutes before half-time when Ronaldo failed to connect with Luis Figo's cross.
But it was not long before Roberto Carlos slid the ball to Solari, who side-stepped Baia before sliding the ball into the net.
There was a worrying moment for Real when Zidane's head made accidental contact with the knee of Ricardo Fernandes, leaving blood spurting on to the turf. But the
Frenchman was soon back on the field sporting a head bandage in time to play the final minutes of the half.
Porto's South African striker Benni McCarthy had the ball in the net just after the second half started, but he was flagged offside.
Real increasingly dominated as Porto shrunk into their own half and Figo probed continually down the right.
When he won a free-kick out wide he pulled it back for Zidane to meet on the bounce and his clean shot passed through a crowded goalmouth and into the net on 67 minutes to make it 3-1.
Both sides had further scoring chances and Casillas threw himself at a Edgaras Jankauskas header to deny Porto.
As Porto fans streamed out of the stadium exits, Raul replaced Ronaldo but his first attempt at goal was an uncharacteristically misjudged lob which was far too high.