& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

S Africa draw tour game

AFP, Taunton
South African pair Neil McKenzie and Monde Zondeki were bright spots for South Africa as their tour match against English country Somerset faded into a draw on a rain-affected final day on Thursday.
In a match which did not start until after lunch, McKenzie pushed his claim for a place in next week's first Test against England as he topscored with 82 not out to help the visitors extend their second innings total to 245 for four.
The tourists declared to leave Somerset a mountain to climb of 327 in 35 overs and the county finished on 109 for three after another rain break.
Zondeki, 20, followed up his five first-innings wickets with one for 20.
South Africa captain Graeme Smith declined to set up an exciting finish with an enterprising declaration, content to watch McKenzie and Boeta Dippenaar build on an overnight 126 for two against some tame bowling.
Dippenaar, unbeaten on 52 at the start, added just 16 before pulling Somerset trialist Gary Gilder to deep backward square where he was caught by Wes Durston.
McKenzie scored an impressive 66 in the first innings and again produced some well-timed strokes to hit 12 fours in his 129-ball innings.
There was bad news for South Africa with jacques Kallis' decision to stay at home with his critically ill father, meaning he could miss the first Test which starts in Edgbaston next Thursday.
SCOREBOARD
Scoreboard on the third day of the three-day tour match between Somerset and South Africa on Thursday:
SOUTH AFRICA: First innings 326
for 4 declared (G Smith 152, G
Kirsten 66, N McKenzie 66 not out)
SOMERSET: First innings 245 for 7 declared (Wood 55, Laraman 41, Bryant 39; Zondeki 5/64)
SOUTH AFRICA: Second innings (overnight 126 for 2)
Kirsten c Gilder b Durston 42
GibbscGazzardbfones 17
Dippenaar c Durston b Gilder 68
McKenzie not out 82
Peterson cGazzard bParsons 6
Smith not out 26
Extras: (nb-4) 4
Total: (For 4 wkts declared in 66 overs) 245
Did not bat: Tsolekile, Adams, Pretorius, Willoughby, Zondeki.
Fall of wkts: 1-36, 2-99, 3-172, 4-200.
Bowler O M R W
Gilder 13 0 56 1
Iones 10 1 45 1
Andrew 11 2 31 0
Laraman 3 18 0
Durston 15 3 42 1
Parsons 10 0 37 1
Wood 4 0 26 0
SOMERSET: Second innings
WoodcTsolekilebZondeki 9
Bryant b Pretorius 27
ParsonslbwbWilloughby 2
Durston not out 30
Gazzardnotout 35
Extras: (w-3, nb-3) 6
Total: (For3wicketsin25 overs) 109
Did not bat: Burns, Blackwell, Laraman, Andrew, Gilder,Iones.
Fallofwkts: 1-16,2-25,3-59.
Bowler O M R W
Pretorius 9 0 42 1
Zondeki 6 2 20 1
Willoughby 7 1 31 1
Peterson 2 0 12 0
Adams 10 4 0
Result: Match drawn.