& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Pakistan's late flurry

AFP, Sharjah
Shoaib Malik hit 76 off 58 balls as Pakistan scored 286 for 8 from 50 overs after electing to bat against Kenya in the last league match of the Sharjah Cup here on Tuesday.
Pakistan, who have already qualified for Thursday's final of the four-nation event against Zimbabwe, notched up the highest total in the otherwise low-scoring tournament.
Misbah-ul Haq made 42 in his first appearance here, while skipper Rashid Latif slammed 38 off 31 in a run-a-ball stand of 72 for the sixth wicket with Malik.
World Cup semifinalists Kenya, who lost both their previous matches to Zimbabwe and Sri Lanka, did well to restrict Pakistan to 150-5 in the 35th over.
But Malik and Latif wrested the initiative with bold hitting, the Pakistan captain taking two boundaries and two sixes in his aggressive knock.
Kenyan captain Steve Tikolo was the most successful bowler for the Africans, his steady off-spin gaining the wickets of Misbah, Yousuf Youhana and Latif.
Pakistan's new opener Mohammad Hafeez provided an entertaining start with a quickfire 36 and Faisal Iqbal made 23 as their team raced to 102-2.
The innings ended with Pakistan plundering 108 runs in the last 10 overs to set Kenya a stiff target of 5.8 runs an over under lights.
SCOREBOARD
Scoreboard of the Pakistan innings in the Sharjah Cup one-day international against Kenya on Tuesday:
PAKISTAN
Hafeez c Otieno b Ongondo 36
Umar b Angara 17
Iqbal c Odumbe b C Obuya 23
Misbah c Patel b Tikolo 42
Yousuf Youhana b Tikolo 18
Malik c C Obuya b Ongondo 76
Latif b Tikolo 38
Rana c D Obuya b Odoyo 13
Sami not out 12
Kaneria not out 0
Extras: (lb-2, w-7, nb-2) 11
Total: (For eight wickets in 50 overs) 286
Fall of wickets: 1-45, 2-63, 3-102, 4-129 5-150, 6-222, 7-265, 8-280
Bowler O M R W
Odoyo 10 1 42 1
Ongondo 9 0 57 2
Angara 8 0 52 1
C Obuya 9 0 56 1
Odumbe 6 0 35 0
Tikolo 8 0 42 3
KENYA: Steve Tikolo, Hitesh Modi Thomas Odoyo, Kennedy Otieno Collins Obuya, Peter Ongondo, Joseph Angara, Jimmy Kamande, David Obuya, Brijal Patel, Maurice Odumbe. Toss: Pakistan
Umpires: Kevan Barbour (Zimbabwe) and Avi Jayaprakash (India)