& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

MSC, Victoria run riot

SPORTS REPORTER
Abahani Krira Chakra were facing an uphill task to save their GrameenPhone Premier Division Super League match against perennial rivals Mohammedan Sporting Club at the BKSP ground in Savar yesterday.
On the penultimate day of the four-day game, Abahani were 25 for no loss in their second innings after Mohammedan set them a victory target of 434 runs.
Resuming the day on 265 for six and still needing another 50 runs to avoid the follow on, Abahani were tantalisingly close to reaching the mark before being all out for 311 in 84.5 overs.
But Mohammedan, instead of enforcing the follow on, decided to bat on and scored 279 for seven in their second innings to take the overall lead to 433.
Former national captain Naimur Rahman led the second innings charge for Mohammedan with his second half century of the match.
Naimur, who scored 67 in the first innings, smashed 86 yesterday in 130 minutes with a six and eight boundaries to lay the foundartion of a big total.
Together with one-down Aftab Ahmed, Naimur shared 128 runs for the third wicket stand before Aftab was out on 81.
Aftab hit seven boundaries in his patient 220-minute stay at the crease.
Among others, Mohammedan's India recruit Sandeep Sharma added
49.
VICTORIAV UTTARA
In the other match at the Dhanmondi Cricket Stadium, Victoria Sporting Club were in total control over Uttara Sporting Club on Day Two.
Fifties from Wasim Nayeem, Rafiqul Islam, Azam Iqbal and Mohammad Salim helped Victoria to a mammoth 406 for four at stumps in reply to Uttara's 225.
Wasim scored highest 97 while Rafiqul made 81.
Azam and Salim were batting on 88 runs each.
Together, the duo shared an undefeated 171-run fifth wicket stand.
SCOREBOARD
Scoreboard on the third day of the four-day GrameenPhone Premier Cricket Super League match between Abahani Krira Chakra and Mohammedan Sporting Club at the BKSP ground yesterday:
MOHAMMEDAN SC: First innings 465 for 8 in 100 overs (Nafees 135, Sandeep 82, Naimur 67, Aftab 40, Suja 4-176)
ABAHANI KC (overnight 265 for 6 in 78 overs)
Hannan c Minhazul b Sandeep 119 Al-Shariar c Anwar b Hasibul 5
Imran b Enamul 31
Sajjad c Hasibul b Enamul 22
Asadullah b Monir 15
Towhid run out 30
Neeyamur b Enamul 31
Arman b Sandeep 1
Nuruzzaman c Enamul b Hasibul 26
Bikash run out 9
Suja not out 0
Extras: (b-7, lb-9, nb-3, w-3) 22
Total: (All out in 84.5 overs) 311
Fall of wickets: 1-7, 2-46, 3-83, 4-112, 5199, 6-260, 7-273, 8-275, 9-311.
Bowler O M R W
Monir 12 2 45 1
Hasibul 9.5 1 48 2
S Sharma 10 2 39 2
Enamul 28 7 70 3
Fahim 17 2 67 0
Naimur 8 1 26 0
MOHAMMEDAN SC: second innings
Nafees c Towhid b Neeyamur 2
Sandeep lbw b Suja 49
Aftab c Asad b Imran 81
Naimur c Neeyamur b Suja 86
Minhazul c Neeyamur b Suja 25
Fahim run out 6
Enamul not out 10
Hasibul c Nuruzzaman b Suja 1
Extras: (b-9, lb-5, nb-2, w-3) 19
Total: (For 7 wkts in 73.3 overs) 279
Fall of wickets: 1-16, 2-99, 3-227, 4-235, 5-260, 6-270, 7-279.
Bowler O M R W
Neeyamur 6 2 11 1
Bikash 9 1 44 0
Hannan 14 0 55 0
Suja 26.3 1 93 4
Arman 9 0 31 0
Imran 9 1 37 1
ABAHANI KC
Hannan batting 11
Al-Shahriar batting 6
Extras: (b-5, nb-3) 8
Total: (For no loss in 5 overs) 26
Bowler O M R W
Sandeep 3 1 12 0
Hasibul 2 0 8 0
Scoreboard on the second day of the four-day GrameenPhone Premier Cricket Super League match between Victoria Sporting Club and Uttara Sporting Club at the Fatullah Stadium yesterday:
UTTARA: First innings (overnight 218 for 9 in 92 overs)
Shafiul lbw b Razzak 19
Moniruzzaman lbw b Manjarul 113
Nayeem b Manjarul 5
Aslam b Manjarul 1
Sumon b Manjarul 0
Al-Amin lbw b Razzak 41
Rashed c Selim b Mustadir 9
Arman c Mustadir b Razzak 9
Monirul b Razzak 6
Debabroto lbw b Razzak 1
Rabbani not out 5
Extras: (b-7, lb-5, nb-4) 16
Total: (All out in97.2 overs) 225
Fall of wickets: 1-36, 2-47, 3-59, 4-63, 5166, 6-201, 7-211, 8-213, 9-214
Bowler O M R W
Mushfiq 8 1 46 0
Nuruzzaman 2 0 13 0
Razzak 24.2 12 49 5
Manjarul 32 18 29 4
Sabbir 18 4 47 0
Masudur 13 2 29 1
VICTORIA SC
Wasim c & b Sumon 97
Parvez c Moniruzzaman b Rabbani 10
Rafiqul c Monirul b Sumon 81
Azam batting 88
Nuruzzaman c Arman b Sumon 2
Salim batting 88
Extras: (b-11, lb-1, nb-23, w-5) 40
Total: (For 4 wkts in 82 overs) 406
Fall of wickets: 1-45, 2-184, 3-230, 4-235.
Bowler O M R W
Debabrata 4 1 33 0
Rabbani 6 0 49 1
Aslam 15 1 65 0
Monirul 25 4 94 0
Nayeem 2 0 11 0
Arman 9 0 45 0
Rana 2 0 20 0
Sumon 19 1 77 3