& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

US prisoners shaky

REUTERS, Doha
One captured American, speaking in a shaky voice, said he had nothing against Iraqis. "They don't bother me, I don't bother them," he said.
A woman soldier with a bandaged ankle held her arms tightly in her lap, her eyes darting back and forth.
Another soldier, lying wounded on a mat, swayed slightly when Iraqis tried to prop him up for the camera.
All five U.S. captives appeared
terrified as they were thrust in front of an Iraqi TV microphone Sunday and peppered with questions. The footage also showed at least four bodies.
U.S. officials confirmed that 12 soldiers were missing after Iraqi forces ambushed an army supply convoy around An Nasiriyah, a major crossing point over the Euphrates northwest of Basra. Relatives in New Mexico and Kansas identified two of the soldiers. Scenes of interrogators questioning four men and a woman were broadcast by the Arab satellite station AlJazeera with footage from state-controlled Iraqi television. Each was interviewed individually.
A senior defence official said the Pentagon (news - web sites) did not know precisely how many captives there might be and would not identify the unit. Some of the prisoners are from Fort Bliss, Texas, said Jean Offutt, a U.S. Army spokeswoman at the base.
Several families of the soldiers gathered at the base Sunday evening. "The mood, of course, is very tragic," she said.
The 507th Maintenance, part of the 111th Air Defense Artillery Brigade, is stationed at Fort Bliss, and at least two of the interviewed prisoners said they were with the 507th.
Each prisoner shown on television spoke American-accented English. All looked terrified.
The woman's eyes darted back and forth and her voice very shaky. She said she was 30 years old, from Texas, and part of the 507th Maintenance. She had a big white bandage around her ankle.
Another prisoner, who said he was from El Paso, Texas, stared directly at the camera and spoke in a clear voice. He often shook his
head and cupped his ear slightly to indicate that he couldn't hear a question. He said: "I follow orders."
A 31-year-old sergeant from New Jersey sat bolt upright in a chair. His hands in his lap, he answered questions in a clipped fashion and said he was with the 507th.
The narrator provided an Arabic translation, but it was possible to hear some of the comments in English.
The captive identified as Miller answered in a shaky voice, his eyes darting back and forth between the interviewer and another person who couldn't be seen on camera.
Asked why he came to Iraq, he replied, "I come to fix broke stuff."
Prodded again by the interviewer, he was asked if he came to shoot Iraqis.
Another prisoner, who also said he was from Texas, was lying on an elaborate maroon mat. One of his arms appeared to be wounded and folded across his chest.
Iraqi TV attempted to interview him, at one point trying to cradle his head to steady it for the camera. They eventually helped him sit up, but he seemed to sway slightly.
The U.S. military says it has more than 2,000 Iraqi prisoners of war.