& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Saurav pounces on Kenya

AFP, Durban
Saurav Ganguly produced a captain's innings of 111 not out as India made a commanding 270 for four in their World Cup day-night semifinal against Kenya at Kingsmead here on Thursday.
Ganguly, bidding to become the first India skipper to lead his country to a World Cup final since Kapil Dev's men won the title 1983, faced just 114 balls.
The left-hander reached his 22nd one-day international century in majestic form with his fifth and final six, off Martin Suji.
Ganguly's third hundred in the tournament meant only teammate Sachin Tendulkar, whose 83 took his record aggregate to 669 in this World Cup, had scored more than
the Indian captain's tally of 441.
It was Ganguly's second hundred against Kenya in two weeks, following the unbeaten 107 he made in India's six-wicket Super Six victory at Cape Town earlier this month.
Tendulkar and fellow opener Virender Sehwag shared a first-wicket stand of 74 after Ganguly won the toss and batted first in overcast conditions.
Kenya's hard-working attack lacked the pace to worry either batsman although many boundary-destined shots slowed up on an outfield subjected to two days of heavy rain.
But Sehwag, who made 33 in 56 balls, departed when he tried to turn Peter Ongondo to leg and got a leading edge to be caught in the covers by Maurice Odumbe.
Ganguly maintained India's momentum, twice hitting legspinner Collins Obuya for sixes over the grandstand in the same over.
But, not for the first time at this World Cup, Tendulkar got out when in sight of a hundred as he pulled Steve Tikolo to deep midwicket where David Obuya took a well-judged catch.
Tendulkar faced 101 balls and hit one six and five fours, putting on 103 in 120 balls with Ganguly, one of several impressive partnerships for the Indians.
SCOREBOARD
Scoreboard of the India innings in their World Cup semifinal match against Kenya at Kingsmead in Durban on Thursday:
INDIA
Sehwag c Odumbe b Ongondo 33
Tendulkar c D Obuya b Tikolo 83
Ganguly not out 111
Kaif run out 15
Yuvraj c D Obuya b Odoyo 16
Dravid not out 1
Extras: (w-9, nb-2) 11
Total: (For 4 wkts in 50 overs) 270
Fall of wickets: 1-74, 2-177, 3-233, 4267
Did not bat: D Mongia, H Singh, Z Khan, J Srinath, A Nehra
Bowler O M R W
Suji 10 1 62 0
Odoyo 10 1 45 1
Ongondo 10 1 38 1
Karim 4 0 25 0
Tikolo 10 0 60 1
C Obuya 6 0 40 0
KENYA: Kennedy Otieno, Ravindu Shah, Steve Tikolo, Maurice Odumbe, David Obuya, Hitesh Modi, Thomas Odoyo, Collins Obuya, Peter Ongondo, Martin Suji, Asif Karim.
Umpires: Steve Bucknor (WIs) and Daryl Harper (Aus)
TV umpire: Simon Taufel (Aus)
Match referee: Mike Procter (RSA)