& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Power supply snapped in Jhenidah

Nor'wester kills one in Magura

Our Correspondent, Magura
Nor'wester lashed Magura and Jhenidah on Friday.
A nor'wester lashed 20 villages in Magura Sadar and Sreepur upazilas on Friday killing a woman and injuring 20 others.
The dead was identified as Malati, 65, of village Boroichara in Sadar upazila. Malati was killed on the spot when a house collapsed at around 12:45 pm. The storm lasted for about 15 minutes.
Nine others were critically injured in house collapse at villages Barunatail, Laskarpur, Rajarampur, Nandalalpur, Atharokhada and Adalpur in Sadar upazila.
They are Borun Kumar, 48, Tariqul 25, Rita, 9, Milton, 5, Akhironnesa, 60, Mazeda, 45, Monindir, 65, Reba Khatun, 50, and Hasan, 40. They were admitted to Magura Sadar Hospital.
At least 80 houses along with standing crops and five educational institutions were damaged. Many trees were uprooted and power lines were snapped in the storm which was accompanied by hailstorm.
The entire district plunged into darkness for about seven hours as 33 KV electric tower in Gopalpur area collapsed.
Power supply in Sreepur upazila was yet to be restored till filing of this report on Saturday afternoon.
Two other injured Asma Khatun, 17, and Tipu, 22, were injured by lightning during the storm. They were also admitted to sadar hospital .
Our Jhenidah correspondent reports: About 14 persons were injured, one of them critically, in a tornado that swept over Jhenidah Sadar, Sailkupa, Harinakundu, Kaliganj, Kotchandpur and Mohespur upazilas on Friday afternoon.
Critically injured Mohabbat Ali was rushed to Magura Sadar Hospital, while others were undergoing treatment at Jhenidah Sadar Hospital.
The tornado broke two towers of Power Development Board (PDB) resulting in disruption of power supply in Jhenidah, Sailkupa and Harinakundu upazilas for several hours.
The affected villages are Naidaga, Suart, Dogachhi, Ghorsal, Fursundi, Harisankarpur, Narikelbaria, Padmakar, Porahati, Kalicharanpur in Jhenidah Sadar and some parts of Nityanadapur and Abaipur unions of Sailkupa and Harinakundu upazilas.
Tin sheds of Narikelbaria police camp, Dogachhi High School, Dhananjoypur High School were blown away. Eleven houses of Azibar Mandal of village Kangshi in Jhenidah Sadar were totally damaged.
Banana plants on 27 bighas of land of a farmer, Shahdat Hossain of village Madhupur were razed to the ground.