& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

MSC trounce Dev Squad

Sports Reporter
Title aspirants Mohammedan Sporting Club finished their first phase of the GrameenPhone Premier Division Cricket League with a 73-run thrashing of BCB Development Squad at the Dhanmondi Cricket Stadium yesterday.
Opener Javed Omar's patient half century helped the Motijheel outfit to a fighting 237 for nine in the stipulated 50 overs after theywere put into bat by.
Javed, the discarded national opener, scored 77 off 121 balls hitting only five boundaries while most of his other colleagues struggled.
Skipper Minhazul Abedin was the next top scorer with 29.
In reply, the Development Squad reached 164 before being all out in 45.3 overs.
Pakistani leg spinner Shahed Mahmud was the wrecker in chief taking four wickets for 42 runs while veteran left arm spinner Enamul Hoque gave him support with three for 15.
It was Mohammedan's eighth win against four defeats. They finished with 44 points from 12 matches. Second placed City Club also have 44 points but they have two games in hand in the first phase.
On the other hand, it was the seventh defeat for Development Squad. Theyhave won five games.
SCOREBOARD
Scoreboard of the GrameenPhone Premier Division Cricket League match between Mohammedan SC and BCB Development Squad at the Dhanmondi Cricket Stadium yesterday:
MOHAMMEDAN SC
Javed c Sagir b Enamul 77
Nafees b Arafat 20
Aftab c Sagir b Arafat 1
S Mahmud b Bashar 21
Minhazul c Kafi b Bashar 29
Naimur c Shafaq b Bashar 18
Fahim run out 11
Enamul not out 22
Anwar c Sahafaq b Arafat 11
Hasibul b Ziaur 1
Munir not out 5
Extras: (b-4, lb-5, nb-4, w-8) 21
Total: (For 9 wkts in 50 overs) 237
Fall of wickets: 1-47, 2-55, 3-86, 4-132, 5-166, 6-182, 7-199, 8-223, 9-227.
Bowler O M R W
Shafaq 5 0 26 0
Ziaur 7 0 50 1
Arafat 10 0 38 3
Nayeem 5 0 22 0
Bashar 10 0 44 3
Enamul 10 1 30 0
Tanveer 3 0 18 0
BCBDEV SQUAD
Nayeem c Aftab b Enamul 13
Sagir stAnwar b Enamul 18
Nazim c Anwar b S Mahmud 63
Kafi b Naimur 0
Ashiq stAnwar b Fahim 18
Tanveer c Enamul b Fahim 9
Bashar c Nafees b S Mahmud 13
Arafat cAnwar b S Mahmud 8
Ziaur c Javed b Enamul 2
Enamul not out 3
Shafaq c Anwar b S Mahmud 4
Extras: (b-1, lb-8, nb-3, w-1) 13
Total: (All out in 45.3 overs) 164
Fall of wickets: 1-31, 2-44, 3-45, 4-94, 5105, 6-138, 7-143, 8-155, 9-159.
Bowler O M R W
Hasibul 5 0 15 0
Naimur 10 1 25 1
Enamul 8 3 15 3
S Mahmud 8.3 0 42 4
Fahim 10 1 37 2
Munir 4 0 21 0
Result: Mohammedan SC won by 73 runs.