& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

Wins for City, BU

UNB, Dhaka
City Club and Brothers Union won their respective matches in the GrameenPhone Premier Division Cricket League at different city venues yesterday.
City Club recorded a comfortable 54-run victory over newcomers Orient Sporting Club at the Dhanmondi Cricket Stadium.
After being sent in to bat, City Club mustered a respectable 245 runs for eight in their stipulated 50 overs with Moniruzzaman making the team highest 60 off 81 balls with the help of four boundaries.
Indian Ashish Kapoor scored 59 off 67 balls that saw eleven fours, Rajin Saleh added 51 off 63 balls featuring two fours and a six, and Tareq Ahmed scored 33 off 58 balls.
Saju Dutta took two wickets conceding 46 runs in 10 overs and Pakistani Rashed Hanif two for 38 in 8 overs.
In reply, Orient Sporting Club were bundled out for 191 in 46.3 overs with Masum making team highest 58 runs off 104 balls that saw six hits across the boundary.
Rashed Hanif followed with a quick 45-ball 40 that was illustrated with three hits to the fence and a big sixer while Sajit Ali Khan scored 35 off
49 balls featuring four boundaries.
Saifullah Jem was the most successful City bowler claiming three wickets for 33 in 10 overs while Alamgir Kabir took two for 47 in 8.3 overs and Jamaluddin Babu two for 32.
Rajin Saleh was adjudged man-of-the-match.
In the other match at the Fatullah Stadium, Brothers Union defeated Surjo Tarun Club by two runs.
Brothers Union could collect 208 before being all out in 49.5 overs after they were sent in to bat with Pakistani Sadab Kabir making highest 53 runs off 87 balls.
Mahbubur Rahman was their second highest scorer with 26 off 43 deliveries. Gazi Salauddin added 20 off 28 balls.
Mominul Kabir Khan grabbed four wickets conceding 25 runs in 9.5 overs and Pakistani Manzoor Akhter four wickets giving away 45 runs in 10 overs.
In reply, Surjo Tarun ran out of overs as they finished their innings on 206 for nine with Dhiman Ghosh scoring team highest 43 runs off 57 balls.
Morshed Ali Khan captured two wickets for 39 runs in 10 overs, Shahnewaz Kabir two for 38 in 10 overs and Sohel Rana two for 42 in 10 overs.