& çâÌæÚUæð´ ·¤è ¥ôÚU Îð¹Ùæ ÁæÚUè ÚU¹ð´ ¥ÍæüÌ ¥ÂÙð ÜÿØ ÂÚU ŠØæÙ ÚU¹ð´Ð ãæÚU Ù ×æÙð´, €UØô´ç·¤ ·¤æ× ·¤ÚUÙð âð ¥æÂ·¤ô ©gðàØ ·¤è Âýæç# ãôÌè ãñ ¥õÚU ÁèßÙ ·¤æ ¹æÜèÂÙ ÎêÚU ãôÌæ ãñÐ ÖÜð ãè ÁèßÙ ×ð´ ç·¤ÌÙè Öè ·¤çÆÙæ§ü €UØô´ Ù ¥æ°, çÁ™ææâæ ¥õÚU ©ˆâæã ÕÙæ° ÚU¹ð´Ð ŠØæÙ ÚU¹ð´, ÜÿØ ã×ðàææ ¥æÂ·Ô¤ Âæâ ãôÌð ãñ´ çÁ‹ãð´ ÂæÙð ·Ô¤ çÜ° ÂýØæâ ¥æÂ ·¤Öè Öè àæéM¤ ·¤ÚU â·¤Ìð ãñ´Ð

otieno makes India sweat

AFP, Cape Town
Kenya's opening batsman Kennedy Otieno rode his luck as the World Cup outsiders put up a spirited performance in their Super Six match against India at Newlands on Friday.
The burly Otieno hit 79 as Kenya made 225 for six after winning the toss and electing to bat in the daynight match.
Otieno, four days short of his 31st birthday, was the main beneficiary of some shoddy Indian fielding, being dropped three times during his 134-ball innings, which included six fours and two sixes.
Otieno and Ravindu Shah put on 75 before Shah was run out for 34 after a mix-up with his longtime opening partner.
But India should have dismissed the openers much earlier, at one stage dropping both off successive deliveries.
Otieno was put down by Harbhajan Singh at square leg off
Ashish Nehra when he had 11. Off the next ball Shah, on 19, was dropped by Dinesh Mongia at slip.
When Otieno was on 18 he hit a straight forward chance to Mohammad Kaif at cover off the luckless Nehra.
Otieno and Thomas Odoyo (32) shared a 76-run stand for the third wicket before Otieno was bowled between bat and pad by a sharp turner from Harbhajan, seven runs after being dropped again on the mid-wicket boundary by Mongia off the same bowler.
Maurice Odumbe hit an unbeaten 34 off 24 balls as Kenya lifted their scoring rate in the closing overs. He too survived a dropped catch, with Indian captain Saurav Ganguly failing to hold on to a drive at cover off Harbhajan when he had 11.
Harbhajan (two for 41) and opening bowler Javagal Srinath (two for 43) were India's most successful bowlers. SCOREBOARD
Scoreboard of the Kenya innings against India in their World Cup Super Six day-night match at Newlands on Friday:
KENYA
Otieno b Harbhajan 79
Shah run out 34
Tikolo c Zaheer b Harbhajan 3
Odoyo lbw b Mongia 32
Odumbe not out 34
Obuya c Mongia b Srinath 8
Ongondo c Tendulkar b Srinath 8
M Suji not out 11
Extras: (b-4, lb-8, w-4) 16
Total: (For 6 wkts in 50 overs) 225
Fall of wickets: 1-75, 2-81, 3-157, 4165, 5-191, 6-206
Did not bat: B Patel, H Modi, T Suji Bowler O M R W
Zaheer 10 1 53 0
Srinath 10 0 43 2
Nehra 10 2 30 0
Harbhajan 10 0 41 2
Mongia 8 0 37 1
Yuvraj 2 0 9 0
INDIA: Saurav Ganguly, Sachin Tendulkar, Virender Sehwag, Mohammad Kaif, Rahul Dravid, Yuvraj Singh, Dinesh Mongia, Harbhajan Singh, Zaheer Khan, Javagal Srinath, Ashish Nehra.
Toss: Kenya
Umpires: Daryl Harper (Aus) and Peter Willey (Eng)
TV umpire: Simon Taufel (Aus)
Match referee: Wasim Raja (Pak)